\begin{minipage}[t]{8in}
\begin{tabular}{ll}
GraphObject*  & graphobject\_name
\end{tabular}\\


 \parbox[b]{2in} \ \ 
\begin{minipage}[t]{4in}Since this is an abstract class, only a pointer to this class object can be declared.\end{minipage}
\end{minipage}
\vspace{0.2in}

